-- Remove duplicate API key from client_configs table
-- Since admin panel is exclusively for Account Forger, we only need system_api_key

-- Remove the api_key column from client_configs
ALTER TABLE client_configs DROP COLUMN IF EXISTS api_key;

-- Update description
COMMENT ON TABLE client_configs IS 'Configuration for Account Forger client (versions, timeouts)';
COMMENT ON TABLE system_api_key IS 'Single API key for Account Forger authentication';